<template>
  <div class="right_bottom">
    <CapsuleChart
      :config="config"
      style="width: 100%; height: 260px"
      :data="data"
    />
  </div>
</template>
<script setup lang="ts">
import { ref, reactive, onMounted } from "vue";
import CapsuleChart from "@/components/datav/capsule-chart";
import { currentGET } from "@/api";
import signalR from "@/utils/signalR";
const config = ref({
  showValue: true,
  unit: "次",
});
const data = ref([]);
const getData = () => {
  currentGET("rightCenter").then((res) => {
    console.log("报警排名", res);
    if (res.success) {
      data.value = res.data;
    } else {
      window["$message"]({
        text: res.msg,
        type: "warning",
      });
    }
  });
};
onMounted(() => {
  getData();
  signalR.joinGroup("BsDataShowArea7");
});
</script>

<style scoped lang="scss">
.right_bottom {
  box-sizing: border-box;
  padding: 0 16px;
}
</style>
